1464185215.0054580

170.00˚ 172.50˚ 175.00˚ 177.50˚ 180.00˚

-70.00˚

-69.00˚

-68.00˚

-67.00˚

-66.00˚

Float 6392 (As of 25 May 2016) : Most Recent Location of Float.