1364766239.0388276

05101520

Pressure (decibar)

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38

Salinity (PSU)

32.000

32.005

32.010

32.015

32.020

32.025

32.030

32.035

32.040

32.045

32.050

32.055

32.060

32.065

32.070

32.075

32.080

32.085

32.090

32.095

32.100

32.105

32.110

32.115 32.120

32.125

32.130

32.135

32.140

32.145

32.150

32.155

32.160

32.165

32.170

32.175

32.180 32.185

32.190

32.195

32.200

32.205

32.210

32.215

32.220

32.225

32.230

32.235

32.240

32.245

32.250

32.255

32.260

32.265

32.270

32.275

32.280

32.285

32.290

32.295

32.300

32.305

32.310

32.315

32.320

32.325

32.330

32.335

32.340

32.345

32.350

32.355

32.360

32.365

32.370

32.375

32.380

32.385 32.390

32.395

32.400

32.405

32.410

32.415

32.420

32.425

32.430

32.435

32.440

32.445

32.450

32.455 32.460

32.465

32.470

32.475

32.480

32.485

32.490

32.495

32.500

32.505

32.510

32.515

32.520

32.525

32.530

32.535

32.540

32.545

32.550

32.555

32.560

32.565

32.570

32.575

32.580

32.585

32.590

32.595

32.600

32.605

32.610

32.615

32.620

32.625

32.630

32.635

32.640

32.645

32.650

32.655 32.660

32.665

32.670

32.675

32.680

32.685

32.690

32.695

32.700

32.705

32.710

32.715

32.720 32.725

32.730

32.735

32.740

32.745

32.750

32.755

32.760

32.765

32.770

32.775

32.780

32.785

32.790

32.795

32.800

32.805

32.810

32.815

32.820

32.825

32.830

32.835

32.840

32.845

32.850

32.855

32.860

32.865

32.870

32.875

32.880

32.885

32.890

32.895

32.900

32.905

32.910

32.915

32.920

32.925 32.930

32.935

32.940

32.945

32.950

32.955

32.960

32.965

32.970

32.975

32.980

32.985

32.990 32.995

33.000

33.005

33.010

33.015

33.020

33.025

33.030

33.035

33.040

33.045

33.050

33.055

33.060

33.065

33.070

33.075

33.080

33.085

33.090

33.095

33.100

33.105

33.110

33.115

33.120

33.125

33.130

33.135

33.140

33.145

33.150

33.155

33.160

33.165

33.170

33.175

33.180

33.185

33.190 33.195

33.200

33.205

33.210

33.215

33.220

33.225

33.230

33.235

33.240

33.245

33.250

33.255

33.260 33.265

33.270

33.275

33.280

33.285

33.290

33.295

33.300

33.305

33.310

33.315

33.320

33.325

33.330

33.335

33.340

33.345

33.350

33.355

33.360

33.365

33.370

33.375

33.380

33.385

33.390

33.395

33.400

33.405

33.410

33.415

33.420

33.425

33.430

33.435

33.440

33.445

33.450

33.455

33.460 33.465

33.470

33.475

33.480

33.485

33.490

33.495

33.500

33.505

33.510

33.515

33.520

33.525

33.530 33.535

33.540

33.545

33.550

33.555

33.560

33.565

33.570

33.575

33.580

33.585

33.590

33.595

33.600

33.605

33.610

33.615

33.620

33.625

33.630

33.635

33.640

33.645

33.650

33.655

33.660

33.665

33.670

33.675

33.680

33.685

33.690

33.695

33.700

33.705

33.710

33.715

33.720

33.725

33.730 33.735

33.740

33.745

33.750

33.755

33.760

33.765

33.770

33.775

33.780

33.785

33.790

33.795 33.800

33.805

33.810

33.815

33.820

33.825

33.830

33.835

33.840

33.845

33.850

33.855

33.860

33.865

33.870

33.875

33.880

33.885

33.890

33.895

33.900

33.905

33.910

33.915

33.920

33.925

33.930

33.935

33.940

33.945

33.950

33.955

33.960

33.965

33.970

33.975

33.980

33.985

33.990

33.995 34.000

34.005

34.010

34.015

34.020

34.025

34.030

34.035

34.040

34.045

34.050

34.055

34.060

34.065 34.070

34.075

34.080

34.085

34.090

34.095

34.100

34.105

34.110

34.115

34.120

34.125

34.130

34.135

34.140

34.145

34.150

34.155

34.160

34.165

34.170

34.175

34.180

34.185

34.190

34.195

34.200

34.205

34.210

34.215

34.220

34.225

34.230

34.235

34.240

34.245

34.250

34.255

34.260

34.265 34.270

34.275

34.280

34.285

34.290

34.295

34.300

34.305

34.310

34.315

34.320

34.325

34.330

34.335 34.340

34.345

34.350

34.355

34.360

34.365

34.370

34.375

34.380

34.385

34.390

34.395

34.400

34.405

34.410

34.415

34.420

34.425

34.430

34.435

34.440

34.445

34.450

34.455

34.460

34.465

34.470

34.475

34.480

34.485

34.490

34.495

34.500

34.505

34.510

34.515

34.520

34.525

34.530

34.535 34.540

34.545

34.550

34.555

34.560

34.565

34.570

34.575

34.580

34.585

34.590

34.595

34.600 34.605

34.610

34.615

34.620

34.625

34.630

34.635

34.640

34.645

34.650

34.655

34.660

34.665

34.670

34.675

34.680

34.685

34.690

34.695

34.700

34.705

34.710

34.715

34.720

34.725

34.730

34.735

34.740

34.745

34.750

34.755

34.760

34.765

34.770

34.775

34.780

34.785

34.790

34.795

34.800

34.805 34.810

34.815

34.820

34.825

34.830

34.835

34.840

34.845

34.850

34.855

34.860

34.865

34.870 34.875

34.880

34.885

34.890

34.895

34.900

34.905

34.910

34.915

34.920

34.925

34.930

34.935

34.940

34.945

34.950

34.955

34.960

34.965

34.970

34.975

34.980

34.985

34.990

34.995

35.000

35.005

35.010

35.015

35.020

35.025

35.030

35.035

35.040

35.045

35.050

35.055

35.060

35.065

35.070 35.075

35.080

35.085

35.090

35.095

35.100

35.105

35.110

35.115

35.120

35.125

35.130

35.135 35.140

35.145

35.150

35.155

35.160

35.165

35.170

35.175

35.180

35.185

35.190

35.195

35.200

35.205

35.210

35.215

35.220

35.225

35.230

35.235

35.240

35.245

35.250

35.255

35.260

35.265

35.270

35.275

35.280

35.285

35.290

35.295

35.300

35.305

35.310

35.315

35.320

35.325

35.330

35.335

35.340 35.345

35.350

35.355

35.360

35.365

35.370

35.375

35.380

35.385

35.390

35.395

35.400

35.405

35.410 35.415

35.420

35.425

35.430

35.435

35.440

35.445

35.450

35.455

35.460

35.465

35.470

35.475

35.480

35.485

35.490

35.495

35.500

35.505

35.510

35.515

35.520

35.525

35.530

35.535

35.540

35.545

35.550

35.555

35.560

35.565

35.570

35.575

35.580

35.585

35.590

35.595

35.600

35.605

35.610 35.615

35.620

35.625

35.630

35.635

35.640

35.645

35.650

35.655

35.660

35.665

35.670

35.675 35.680

35.685

35.690

35.695

35.700

35.705

35.710

35.715

35.720

35.725

35.730

35.735

35.740

35.745

35.750

35.755

35.760

35.765

35.770

35.775

35.780

35.785

35.790

35.795

35.800

35.805

35.810

35.815

35.820

35.825

35.830

35.835

35.840

35.845

35.850

35.855

35.860

35.865

35.870

35.875 35.880

35.885

35.890

35.895

35.900

35.905

35.910

35.915

35.920

35.925

35.930

35.935

35.940

35.945 35.950

35.955

35.960

35.965

35.970

35.975

35.980

35.985

35.990

35.995

36.000

36.005

36.010

36.015

36.020

36.025

36.030

36.035

36.040

36.045

36.050

36.055

36.060

36.065

36.070

36.075

36.080

36.085

36.090

36.095

36.100

36.105

36.110

36.115

36.120

36.125

36.130

36.135

36.140

36.145 36.150

36.155

36.160

36.165

36.170

36.175

36.180

36.185

36.190

36.195

36.200

36.205

36.210

36.215 36.220

36.225

36.230

36.235

36.240

36.245

36.250

36.255

36.260

36.265

36.270

36.275

36.280

36.285

36.290

36.295

36.300

36.305

36.310

36.315

36.320

36.325

36.330

36.335

36.340

36.345

36.350

36.355

36.360

36.365

36.370

36.375

36.380

36.385

36.390

36.395

36.400

36.405

36.410

36.415 36.420

36.425

36.430

36.435

36.440

36.445

36.450

36.455

36.460

36.465

36.470

36.475

36.480 36.485

36.490

36.495

36.500

36.505

36.510

36.515

36.520

36.525

36.530

36.535

36.540

36.545

36.550

36.555

36.560

36.565

36.570

36.575

36.580

36.585

36.590

36.595

36.600

36.605

36.610

36.615

36.620

36.625

36.630

36.635

36.640

36.645

36.650

36.655

36.660

36.665

36.670

36.675

36.680

36.685 36.690

36.695

36.700

36.705

36.710

36.715

36.720

36.725

36.730

36.735

36.740

36.745

36.750 36.755

36.760

36.765

36.770

36.775

36.780

36.785

36.790

36.795

36.800

36.805

36.810

36.815

36.820

36.825

36.830

36.835

36.840

36.845

36.850

36.855

36.860

36.865

36.870

36.875

36.880

36.885

36.890

36.895

36.900

36.905

36.910

36.915

36.920

36.925

36.930

36.935

36.940

36.945

36.950 36.955

36.960

36.965

36.970

36.975

36.980

36.985

36.990

36.995

37.000

37.005

37.010

37.015 37.020

37.025

37.030

37.035

37.040

37.045

37.050

37.055

37.060

37.065

37.070

37.075

37.080

37.085

37.090

37.095

37.100

37.105

37.110

37.115

37.120

37.125

37.130

37.135

37.140

37.145

37.150

37.155

37.160

37.165

37.170

37.175

37.180

37.185

37.190

37.195

37.200

37.205

37.210

37.215

37.220 37.225

37.230

37.235

37.240

37.245

37.250

37.255

37.260

37.265

37.270

37.275

37.280

37.285

37.290 37.295

37.300

37.305

37.310

37.315

37.320

37.325

37.330

37.335

37.340

37.345

37.350

37.355

37.360

37.365

37.370

37.375

37.380

37.385

37.390

37.395

37.400

37.405

37.410

37.415

37.420

37.425

37.430

37.435

37.440

37.445

37.450

37.455

37.460

37.465

37.470

37.475

37.480

37.485

37.490 37.495

37.500

37.505

37.510

37.515

37.520

37.525

37.530

37.535

37.540

37.545

37.550

37.555 37.560

37.565

37.570

37.575

37.580

37.585

37.590

37.595

37.600

37.605

37.610

37.615

37.620

37.625

37.630

37.635

37.640

37.645

37.650

37.655

37.660

37.665

37.670

37.675

37.680

37.685

37.690

37.695

37.700

37.705

37.710

37.715

37.720

37.725

37.730

37.735

37.740

37.745

37.750

37.755

37.760 37.765

37.770

37.775

37.780

37.785

37.790

37.795

37.800

37.805

37.810

37.815

37.820

37.825 37.830

37.835

37.840

37.845

37.850

37.855

37.860

37.865

37.870

37.875

37.880

37.885

37.890

37.895

37.900

37.905

37.910

37.915

37.920

37.925

37.930

37.935

37.940

37.945

37.950

37.955

37.960

37.965

37.970

37.975

37.980

37.985

37.990

37.995

38.000

Near-Surface Temperature (˚C)

0 5 10 15 20 25 30 35

In situ Temperature (˚C) 0 5

Near-surface (unpumped)

temperature.

In situ (pumped)

temperature.

Float: 8126

Profile: 002

Location: 44.9˚S 114.3˚W

Date: 11/08/2012

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38

Salinity (PSU)

32 33 34 35 36 37 38

Salinity (PSU)

0 5 10 15 20 25 30 35

In situ Temperature (˚C)

Float: 8126

Profile: 002

Location: 44.9˚S 114.3˚W

Date: 11/08/2012

05101520253035

In situ Temperature (˚C)

32 33 34 35 36 37 38

Salinity (PSU)

32˚E33˚E34˚E

35˚E36˚E37˚E

38˚E

0˚

5˚N

10˚N

15˚N

20˚N

25˚N

30˚N

35˚N

05101520253035

In situ Temperature (˚C)

32 33 34 35 36 37 38

Salinity (PSU)

05101520253035

In situ Temperature (˚C)

32 33 34 35 36 37 38

Salinity (PSU)