1364767955.0388276

05101520

Pressure (decibar)

05101520

Pressure (decibar)

18.52 18.56 18.60 18.64 18.68 18.72 18.76 Near-Surface Temperature (˚C)

0.000.040.080.120.160.200.240.280.320.360.400.440.480.520.560.600.640.680.720.760.800.840.880.920.961.001.041.081.121.161.201.241.281.321.361.401.441.481.521.561.601.641.681.721.761.801.841.881.921.962.002.042.082.122.162.202.242.282.322.362.402.442.482.522.562.602.642.682.722.762.802.842.882.922.963.003.043.083.123.163.203.243.283.323.363.403.443.483.523.563.603.643.683.723.763.803.843.883.923.964.004.044.084.124.164.204.244.284.324.364.404.444.484.524.564.604.644.684.724.764.804.844.884.924.965.005.045.085.125.165.205.245.285.325.365.405.445.485.525.565.605.645.685.725.765.805.845.885.925.966.006.046.086.126.166.206.246.286.326.366.406.446.486.526.566.606.646.686.726.766.806.846.886.926.967.00

Near-surface (unpumped) temperature. In situ (pumped) temperature.

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

Salinity (PSU)

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

0 5 10 15 20 25 30 35

In situ Temperature (˚C)

In situ Temperature (˚C)

Float: 8082 Profile: 005 Location: 41.3˚S 173.7˚W Date: 01/22/2013

0

Float: 8082 Profile: 005 Location: 41.3˚S 173.7˚W Date: 01/22/2013

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)