1364764816.0388276

05101520

Pressure (decibar)

05101520

Pressure (decibar)

20.625 20.650 20.675 20.700 20.725 20.750

Near-Surface Temperature (˚C)

0.000

0.025

0.050

0.075

0.100

0.125

0.150

0.175

0.200

0.225

0.250

0.275

0.300

0.325

0.350

0.375

0.400

0.425

0.450

0.475

0.500

0.525

0.550

0.575

0.600

0.625

0.650

0.675

0.700

0.725

0.750

0.775

0.800

0.825

0.850

0.875

0.900

0.925

0.950

0.975

1.000

1.025

1.050

1.075

1.100

1.125

1.150

1.175

1.200

1.225

1.250

1.275

1.300

1.325

1.350

1.375

1.400

1.425

1.450

1.475

1.500

1.525

1.550

1.575

1.600

1.625

1.650

1.675

1.700

1.725

1.750

1.775

1.800

1.825

1.850

1.875

1.900

1.925

1.950

1.975

2.000

2.025

2.050

2.075

2.100

2.125

2.150

2.175

2.200

2.225

2.250

2.275

2.300

2.325

2.350

2.375

2.400

2.425

2.450

2.475

2.500

2.525

2.550

2.575

2.600

2.625

2.650

2.675

2.700

2.725

2.750

2.775

2.800

2.825

2.850

2.875

2.900

2.925

2.950

2.975

3.000

3.025

3.050

3.075

3.100

3.125

3.150

3.175

3.200

3.225

3.250

3.275

3.300

3.325

3.350

3.375

3.400

3.425

3.450

3.475

3.500

3.525

3.550

3.575

3.600

3.625

3.650

3.675

3.700

3.725

3.750

3.775

3.800

3.825

3.850

3.875

3.900

3.925

3.950

3.975

4.000

4.025

4.050

4.075

4.100

4.125

4.150

4.175

4.200

4.225

4.250

4.275

4.300

4.325

4.350

4.375

4.400

4.425

4.450

4.475

4.500

4.525

4.550

4.575

4.600

4.625

4.650

4.675

4.700

4.725

4.750

4.775

4.800

4.825

4.850

4.875

4.900

4.925

4.950

4.975

5.000

5.025

5.050

5.075

5.100

5.125

5.150

5.175

5.200

5.225

5.250

5.275

5.300

5.325

5.350

5.375

5.400

5.425

5.450

5.475

5.500

5.525

5.550

5.575

5.600

5.625

5.650

5.675

5.700

5.725

5.750

5.775

5.800

5.825

5.850

5.875

5.900

5.925

5.950

5.975

6.000

6.025

6.050

6.075

6.100

6.125

6.150

6.175

6.200

6.225

6.250

6.275

6.300

6.325

6.350

6.375

6.400

6.425

6.450

6.475

6.500

6.525

6.550

6.575

6.600

6.625

6.650

6.675

6.700

6.725

6.750

6.775

6.800

6.825

6.850

6.875

6.900

6.925

6.950

6.975

7.000

Near-surface (unpumped) temperature. In situ (pumped) temperature.

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38

Salinity (PSU)

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38

Salinity (PSU)

0 5 10 15 20 25 30 35

In situ Temperature (˚C)

Float: 7845 Profile: 014 Location: 27.7˚N 148.4˚W Date: 03/12/2012

0

Float: 7845 Profile: 014 Location: 27.7˚N 148.4˚W Date: 03/12/2012

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)

32˚33˚34˚ 35˚36˚37˚ 38˚

0˚

5˚

10˚

15˚

20˚

25˚

30˚

35˚

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)