1408332387.5919028

-1.5-1.0-0.50.00.51.01.52.02.53.03.54.0

Insitu Temperature (˚C)

25 26 27 28 29 30 31 32 33

Salinity (PSU)

20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26

Insitu Temperature (˚C)

25 26 27 28 29 30 31 32 33

Salinity (PSU)

Insitu Temperature (˚C)

Salinity (PSU)

Float 7683 (All profiles as of 17 Aug 2014)