1364800045.0388276

0100200300400500600700800900

1000

1100

1200

Pressure (decibar)

34.234.334.434.534.634.734.834.935.0

Salinity (PSU)

-2.0-1.9-1.8-1.7-1.6-1.5-1.4-1.3-1.2-1.1-1.0-0.9-0.8-0.7-0.6-0.5-0.4-0.3-0.2-0.10.00.10.20.30.40.50.60.70.80.91.01.11.21.31.41.51.61.71.81.92.02.12.22.32.42.52.62.72.82.93.03.13.23.33.43.53.63.73.83.94.04.14.24.34.44.54.64.74.84.95.05.15.25.35.45.55.65.75.85.96.06.16.26.36.46.56.66.76.86.97.07.17.27.37.47.57.67.77.87.98.08.18.28.38.48.58.68.78.88.99.09.19.29.39.49.59.69.79.89.910.010.110.210.310.410.510.610.710.810.911.011.111.211.311.411.511.611.711.811.912.012.112.212.312.412.512.612.712.812.913.013.113.213.313.413.513.613.713.813.914.014.114.214.314.414.514.614.714.814.915.015.115.215.315.415.515.615.715.815.916.016.116.216.316.416.516.616.716.816.917.017.117.217.317.417.517.617.717.817.918.018.118.218.318.418.518.618.718.818.919.019.119.219.319.419.519.619.719.819.920.020.120.220.320.420.520.620.720.820.921.021.121.221.321.421.521.621.721.821.922.022.122.222.322.422.522.622.722.822.923.023.123.223.323.423.523.623.723.823.924.024.124.224.324.424.524.624.724.824.925.025.125.225.325.425.525.625.725.825.926.026.126.226.326.426.526.626.726.826.927.027.127.227.327.427.527.627.727.827.928.028.128.228.328.428.528.628.728.828.929.029.129.229.329.429.529.629.729.829.930.030.130.230.330.430.530.630.730.830.931.031.131.231.331.431.531.631.731.831.932.032.132.232.332.432.532.632.732.832.933.033.133.233.333.433.533.633.733.833.934.034.134.234.334.434.534.634.734.834.935.035.135.235.335.435.535.635.735.835.936.036.136.236.336.436.536.636.736.836.937.037.137.237.337.437.537.637.737.837.938.038.138.238.338.438.538.638.738.838.939.039.139.239.339.439.539.639.739.839.940.040.140.240.340.440.540.640.740.840.941.041.141.241.341.441.541.641.741.841.942.042.142.242.342.442.542.642.742.842.943.043.143.243.343.443.543.643.743.843.944.044.144.244.344.444.544.644.744.844.945.045.145.245.345.445.545.645.745.845.946.046.146.246.346.446.546.646.746.846.947.047.147.247.347.447.547.647.747.847.948.048.148.248.348.448.548.648.748.848.949.049.149.249.349.449.549.649.749.849.950.0 Salinity (PSU)

2 4 6 8 10 12 14

Insitu Temperature (˚C)

Pressure (decibar)

0 100 200 300 400

Optode Oxygen Concentration (μm/kg)

0 100 200 300 400 500

FLBB Backscatter channel (counts)

0 10 20 30 40 50

Nitrate Concentration (μm/kg)

0100200300400500

FLBB Fluorescence channel (counts)

0100200300400500

FLBB Backscatter channel (counts)

-1.0 -0.5 0.0 0.5

ΔT= T^{Opt} - T^{SBE} (˚C)

Float: 7552 Profile: 040 Location: 42.9˚S 96.3˚E Date: 10/03/2012

05101520253035

Insitu Temperature (˚C)

32333435363738

Salinity (PSU)

Insitu Temperature (˚C)

Salinity (PSU)