1364799907.0388276

0100200300400500600700800900

1000

1100

1200

Pressure (decibar)

34.234.334.434.534.634.734.834.935.0 Salinity (PSU)

2 4 6 8 10 12 14

Insitu Temperature (˚C)

2.02.12.22.32.42.52.62.72.82.93.03.13.23.33.43.53.63.73.83.94.04.14.24.34.44.54.64.74.84.95.05.15.25.35.45.55.65.75.85.96.06.16.26.36.46.56.66.76.86.97.07.17.27.37.47.57.67.77.87.98.08.18.28.38.48.58.68.78.88.99.09.19.29.39.49.59.69.79.89.910.010.110.210.310.410.510.610.710.810.911.011.111.211.311.411.511.611.711.811.912.012.112.212.312.412.512.612.712.812.913.013.113.213.313.413.513.613.713.813.914.0

2.02.12.22.32.42.52.62.72.82.93.03.13.23.33.43.53.63.73.83.94.04.14.24.34.44.54.64.74.84.95.05.15.25.35.45.55.65.75.85.96.06.16.26.36.46.56.66.76.86.97.07.17.27.37.47.57.6

2.02.12.22.32.42.52.62.72.82.93.03.13.23.33.43.53.63.73.83.94.04.14.24.34.44.54.64.74.84.95.05.15.25.35.45.55.67.7 7.87.98.08.18.28.38.48.58.68.78.88.99.09.19.29.39.49.59.69.79.89.910.010.110.210.310.410.510.610.710.810.911.011.111.211.311.411.511.611.711.811.912.012.112.212.312.412.512.612.712.812.913.013.113.213.313.413.513.613.713.813.914.0 5.7 5.85.96.06.16.26.36.46.56.66.76.86.97.07.17.27.37.47.57.67.77.87.98.08.18.28.38.48.58.68.78.88.99.09.19.29.39.49.59.69.79.89.910.010.110.210.310.410.510.610.710.810.911.011.111.211.311.411.511.611.711.811.912.012.112.212.312.412.512.612.712.812.913.013.113.213.313.413.513.613.713.813.914.0

0 100 200 300 400

Optode Oxygen Concentration (μm/kg) 2 4 6 8 10 12 14

Insitu Temperature (˚C)

1000

1100

1200

Pressure (decibar)

0 10 20 30 40 50

Nitrate Concentration (μm/kg)

0 100 200 300 400 500 FLBB Fluorescence channel (counts)

0 100 200 300 400 500

FLBB Backscatter channel (counts)

FLBB Backscatter channel (counts)

-1.0 -0.5 0.0 0.5

ΔT= T^{Opt} - T^{SBE} (˚C)

0100200300400500600700800900

1000

1100

1200

Pressure (decibar)

1000

1100

1200

Pressure (decibar)

-1.0 -0.5 0.0 0.5 ΔT= T^{Opt} - T^{SBE} (˚C)

Float: 7552 Profile: 002 Location: 43.8˚S 101.4˚E Date: 03/20/2012

0.0 0.5 1.0

Float: 7552 Profile: 002 Location: 43.8˚S 101.4˚E Date: 03/20/2012

05101520253035

Insitu Temperature (˚C)

32 33 34 35 36 37 38

Salinity (PSU)

32˚E33˚E34˚E 35˚E36˚E37˚E 38˚E

0˚

5˚N

10˚N

15˚N

20˚N

25˚N

30˚N

35˚N

05101520253035

Insitu Temperature (˚C)

32 33 34 35 36 37 38

Salinity (PSU)

05101520253035

Insitu Temperature (˚C)

32 33 34 35 36 37 38

Salinity (PSU)