1364748866.0388276

05101520

Pressure (decibar)

25.225 25.250 25.275 25.300 25.325 25.350 Near-Surface Temperature (˚C)

05101520

Pressure (decibar)

0.000

0.025

0.050

0.075

0.100

0.125

0.150

0.175

0.200

0.225

0.250

0.275

0.300

0.325

0.350

0.375

0.400

0.425

0.450

0.475

0.500

0.525

0.550

0.575

0.600

0.625

0.650

0.675

0.700

0.725

0.750

0.775

0.800

0.825

0.850

0.875

0.900

0.925

0.950

0.975

1.000

1.025

1.050

1.075

1.100

1.125

1.150

1.175

1.200

1.225

1.250

1.275

1.300

1.325

1.350

1.375

1.400

1.425

1.450

1.475

1.500

1.525

1.550

1.575

1.600

1.625

1.650

1.675

1.700

1.725

1.750

1.775

1.800

1.825

1.850

1.875

1.900

1.925

1.950

1.975

2.000

2.025

2.050

2.075

2.100

2.125

2.150

2.175

2.200

2.225

2.250

2.275

2.300

2.325

2.350

2.375

2.400

2.425

2.450

2.475

2.500

2.525

2.550

2.575

2.600

2.625

2.650

2.675

2.700

2.725

2.750

2.775

2.800

2.825

2.850

2.875

2.900

2.925

2.950

2.975

3.000

3.025

3.050

3.075

3.100

3.125

3.150

3.175

3.200

3.225

3.250

3.275

3.300

3.325

3.350

3.375

3.400

3.425

3.450

3.475

3.500

3.525

3.550

3.575

3.600

3.625

3.650

3.675

3.700

3.725

3.750

3.775

3.800

3.825

3.850

3.875

3.900

3.925

3.950

3.975

4.000

4.025

4.050

4.075

4.100

4.125

4.150

4.175

4.200

4.225

4.250

4.275

4.300

4.325

4.350

4.375

4.400

4.425

4.450

4.475

4.500

4.525

4.550

4.575

4.600

4.625

4.650

4.675

4.700

4.725

4.750

4.775

4.800

4.825

4.850

4.875

4.900

4.925

4.950

4.975

5.000

5.025

5.050

5.075

5.100

5.125

5.150

5.175

5.200

5.225

5.250

5.275

5.300

5.325

5.350

5.375

5.400

5.425

5.450

5.475

5.500

5.525

5.550

5.575

5.600

5.625

5.650

5.675

5.700

5.725

5.750

5.775

5.800

5.825

5.850

5.875

5.900

5.925

5.950

5.975

6.000

6.025

6.050

6.075

6.100

6.125

6.150

6.175

6.200

6.225

6.250

6.275

6.300

6.325

6.350

6.375

6.400

6.425

6.450

6.475

6.500

6.525

6.550

6.575

6.600

6.625

6.650

6.675

6.700

6.725

6.750

6.775

6.800

6.825

6.850

6.875

6.900

6.925

6.950

6.975

7.000 Near-Surface Temperature (˚C)

Near-surface (unpumped) temperature. In situ (pumped) temperature.

6.0% % PostScript produced by: % %% psxy -Jx1 -R0/7/0/5 -K -O -ST0.06 -G255/0/0 S 1 W S [] 0 B S 0.314 0.784 0.314 C % % Activate Map clip path % % Start of clip path S V 0 0 M 2100 0 D 0 1500 D -2100 0 D P eoclip N % End of clip path. Clipping is currently ON 1 0 0 24 1458 473 T2 % % Deactivate Map clip path % S U %Clipping is currently OFF S [] 0 B S 75

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

0 5 10 15 20 25 30 35

In situ Temperature (˚C)

-2-101234567891011213141516171819202122324252627282930313233435

Float: 7426 Profile: 035 Location: 11.9˚S 119.1˚W Date: 09/06/2012

Float: 7426 Profile: 035 Location: 11.9˚S 119.1˚W Date: 09/06/2012

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)