1376743961.0388276

05101520

Pressure (decibar)

22.5 23.0 23.5 24.0 24.5 25.0 25.5 Near-Surface Temperature (˚C)

Near-surface (unpumped) temperature. In situ (pumped) temperature.

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

0 5 10 15 20 25 30 35

In situ Temperature (˚C)

Float: 7403 Profile: 072 Location: 19.4˚S 174.9˚W Date: 08/16/2013

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)