1364750687.0388276

05101520

Pressure (decibar)

29.08 29.10 29.12 29.14 29.16 Near-Surface Temperature (˚C)

05101520

Pressure (decibar)

0.000.020.040.060.080.100.120.140.160.180.200.220.240.260.280.300.320.340.360.380.400.420.440.460.480.500.520.540.560.580.600.620.640.660.680.700.720.740.760.780.800.820.840.860.880.900.920.940.960.981.001.021.041.061.081.101.121.141.161.181.201.221.241.261.281.301.321.341.361.381.401.421.441.461.481.501.521.541.561.581.601.621.641.661.681.701.721.741.761.781.801.821.841.861.881.901.921.941.961.982.002.022.042.062.082.102.122.142.162.182.202.222.242.262.282.302.322.342.362.382.402.422.442.462.482.502.522.542.562.582.602.622.642.662.682.702.722.742.762.782.802.822.842.862.882.902.922.942.962.983.003.023.043.063.083.103.123.143.163.183.203.223.243.263.283.303.323.343.363.383.403.423.443.463.483.503.523.543.563.583.603.623.643.663.683.703.723.743.763.783.803.823.843.863.883.903.923.943.963.984.004.024.044.064.084.104.124.144.164.184.204.224.244.264.284.304.324.344.364.384.404.424.444.464.484.504.524.544.564.584.604.624.644.664.684.704.724.744.764.784.804.824.844.864.884.904.924.944.964.985.005.025.045.065.085.105.125.145.165.185.205.225.245.265.285.305.325.345.365.385.405.425.445.465.485.505.525.545.565.585.605.625.645.665.685.705.725.745.765.785.805.825.845.865.885.905.925.945.965.986.006.026.046.066.086.106.126.146.166.186.206.226.246.26

6.28 6.306.326.346.366.386.406.426.446.466.486.506.526.546.566.586.606.626.646.666.686.706.726.746.766.786.806.826.846.866.886.906.926.946.966.987.00 Near-Surface Temperature (˚C)

Near-surface (unpumped) temperature. In situ (pumped) temperature.

0.000.020.040.060.080.100.120.140.160.180.200.220.240.260.280.300.320.340.360.380.400.420.440.460.480.500.520.540.560.580.600.620.640.660.680.700.720.740.760.780.800.820.840.860.880.900.920.940.960.981.001.021.041.061.081.101.121.141.161.181.201.221.241.261.281.301.321.341.361.381.401.421.441.461.481.501.521.541.561.581.601.621.641.661.681.701.721.741.761.781.801.821.841.861.881.901.921.941.961.982.002.022.042.062.082.102.122.142.162.182.202.222.242.262.282.302.322.342.362.38

2.40 2.422.44

2.462.482.502.522.542.562.582.602.622.642.662.682.702.722.742.762.782.802.822.842.862.882.902.922.942.962.983.003.023.043.063.083.103.123.143.163.183.203.223.243.263.283.303.323.343.363.383.403.423.443.463.483.503.523.543.563.583.603.623.643.663.683.703.723.743.763.783.803.823.843.863.883.903.923.943.963.984.004.024.044.064.084.104.124.144.164.184.204.224.244.264.284.304.324.344.364.384.404.424.444.464.484.504.524.544.564.584.604.624.644.664.684.704.724.744.764.784.804.824.844.864.884.904.924.944.964.985.005.025.045.065.085.105.125.145.165.185.205.225.245.265.285.305.325.345.365.385.405.425.445.465.485.505.525.545.565.585.605.625.645.665.685.705.725.745.765.785.805.825.845.865.885.905.925.945.965.986.006.026.046.066.086.106.126.146.166.186.206.226.246.266.286.306.326.346.366.386.406.426.446.466.486.506.526.546.566.586.606.626.646.666.686.706.726.746.766.786.806.826.846.866.886.906.926.946.966.987.00

0.000.020.040.060.080.100.120.140.160.180.200.220.240.260.280.300.320.340.360.380.400.420.440.460.480.500.520.540.560.580.600.620.640.660.680.700.720.740.760.780.800.820.840.860.880.900.920.940.960.981.001.021.041.061.081.101.121.141.161.181.201.221.241.261.281.301.321.341.361.381.401.421.441.461.481.501.521.541.561.581.601.621.641.661.681.701.721.741.761.781.801.821.841.861.881.901.921.941.961.982.002.022.042.062.082.102.122.142.162.182.202.222.242.262.282.302.322.342.362.382.402.422.442.462.482.502.522.542.562.582.602.622.642.662.682.702.722.742.762.782.802.822.842.862.882.902.922.942.962.983.003.023.043.063.083.103.123.143.163.183.203.223.243.263.283.303.323.343.363.383.403.423.443.463.483.503.523.543.563.583.603.623.643.663.683.703.723.743.763.783.803.823.843.863.883.903.923.943.963.984.004.024.044.064.084.104.124.144.164.184.204.224.244.264.284.304.324.344.364.384.404.424.444.464.484.504.524.544.564.584.604.624.644.664.684.704.724.744.764.784.804.824.844.864.884.904.924.944.964.985.005.025.045.065.085.105.125.145.165.185.205.225.245.265.285.305.325.345.365.385.405.425.445.465.485.505.525.545.565.585.605.625.645.665.685.705.725.745.765.785.805.825.845.865.885.905.925.945.965.986.006.026.046.066.086.106.126.146.166.186.206.226.246.266.286.306.326.346.366.386.406.426.446.466.486.506.526.546.566.586.606.626.646.666.686.706.726.746.766.786.806.826.846.866.886.906.926.946.966.987.00

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

0 5 10 15 20 25 30 35

In situ Temperature (˚C)

-2-101234567891011213141516171819202122324252627282930313233435

Salinity (PSU)

Float: 6256 Profile: 051 Location: 10.3˚S 157.0˚W Date: 03/07/2013

0 5 10 15 20 25 30 35

In situ Temperature (˚C)

Float: 6256 Profile: 051 Location: 10.3˚S 157.0˚W Date: 03/07/2013

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)

32˚33˚34˚ 35˚36˚37˚ 38˚

0˚

5˚

10˚

15˚

20˚

25˚

30˚

35˚

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)