1408326870.5919028

-1.5-1.0-0.50.00.51.01.52.02.5

Insitu Temperature (˚C)

33.6 33.8 34.0 34.2 34.4 34.6 34.8

Salinity (PSU)

27 27.5

160 200 240 280 320 360

Oxygen Concentration (μm/kg)

Float 6095 (All profiles as of 17 Aug 2014)