1364805130.0388276

0102030

Pressure (decibar)

31.2 31.6 32.0 32.4 32.8 Salinity (PSU)

25.00 25.25 25.50 25.75 26.00 26.25

In situ Temperature (˚C)

SBE41 salinity SBE41 termperature STS salinity STS temperature

STS refers to auxiliary high-resolution near-surface T-S measurements funded by NASA.

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

0 5 10 15 20 25 30 35

In situ Temperature (˚C)

Float: 5233 Profile: 419 Location: 18.2˚N 87.6˚E Date: 02/12/2013

05101520253035

In situ Temperature (˚C)

32333435363738

Salinity (PSU)

0.000.050.100.150.200.250.300.350.400.450.500.550.600.650.700.750.800.850.900.951.001.051.101.151.201.251.301.351.401.451.501.551.601.651.701.751.801.851.901.952.002.052.102.152.202.252.302.352.402.452.502.552.602.652.702.752.802.852.902.953.003.053.103.153.203.253.303.353.403.453.503.553.603.653.703.753.803.853.903.954.004.054.104.154.204.254.304.354.404.454.504.554.604.654.704.754.804.854.904.955.005.055.105.155.205.255.305.355.405.455.505.555.605.655.705.755.805.855.905.956.006.056.106.156.206.256.306.356.406.456.506.556.606.656.706.756.806.856.906.957.00

In situ Temperature (˚C)