1408322483.5919028

22.523 23.524 24.525 25.526 26.527 27.528 28.529 29.530 30.531 31.532 32.533 33.534

21.522 22.523 23.524 24.525 25.526 26.527 27.528 28.529 29.530 30.531 31.532 32.5

15 15.5 16 16.5 17 17.5 18 18.5 19 19.5 20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27

15 15.5 16 16.5 17 17.5 18 18.5 19 19.5 20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27 27.5 28 0510152025303540455055

Insitu Temperature (˚C)

27.5 30.0 32.5 35.0 37.5 40.0 42.5

Salinity (PSU)

0 40 80 120 160 200 240

O_2 Concentration (μm/kg)

Float 5130 (All profiles as of 17 Aug 2014)