1819202122232425262728293031

Insitu Temperature (˚C)

32.0 32.5 33.0 33.5 34.0 34.5 35.0 Salinity (PSU)

21

21.5

22

22.5

23

23.5

24

24.5

21.5

22

22.5

23

23.5

24

24.5

25

0 50 100 150 200 250 300

O_2 Concentration (μm/kg)

Float 23387 (All profiles as of 20 Jul 2025)