0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

33.25 33.5033.7534.00 34.25 34.5034.75 Salinity (PSU)

-2 -1 0 1 2

Insitu Temperature (˚C)

0 100 200 300 400

Optode Oxygen Concentration (μm/kg)

0 10 20 30 40 50

Nitrate Concentration (μm/kg)

0 100 200 300 400 500 FLBB Fluorescence channel (counts)

0 100 200 300 400 500 FLBB Backscatter channel (counts)

-1.0 -0.5 0.0 0.5 ΔT= T^{Opt} - T^{SBE} (˚C)

Float: 20623 Profile: 018 Location: -0.0˚S 0.0˚E Date: 06/30/2023

05101520253035

Insitu Temperature (˚C)

32 33 34 35 36 37 38

Salinity (PSU)