050100150200250300

OCR-504 Pressure (decibar)

0 250 500 750 1000 1250 1500

OCR PAR (μMole/m^2/sec)

0501001502002503005010015020025030050100150200250300

0.0 0.4 0.8 1.2 1.6 2.0

OCR 380nm (W/m^2/nm)

0.0 0.4 0.8 1.2 1.6 2.0

OCR 443nm (W/m^2/nm)

0.0 0.4 0.8 1.2 1.6 2.0

OCR 490nm (W/m^2/nm)

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

0 5 10 15 20 25 30 35

Insitu Temperature (˚C)

Float: 19191 Profile: 137 Location: 16.8˚S -118.0˚E Date: 04/14/2023

05101520253035

Insitu Temperature (˚C)

32 33 34 35 36 37 38

Salinity (PSU)