246810121416182022

Insitu Temperature (˚C)

16 20 24 28 32 36 Salinity (PSU)

1515.51616.51717.51818.51919.52020.52121.52222.52323.52424.52525.52626.52727.5

23.5 24 24.5 25 25.5

26

26.5

27

24.5 25 25.5 26 26.5

27

27.5

Float 18183 (All profiles as of 05 Nov 2024)