0.02.55.07.510.012.515.017.520.022.525.027.530.0

Insitu Temperature (˚C)

34.0 34.5 35.0 35.5 36.0 36.5 37.0 Salinity (PSU)

27.5 28 28.5 29 29.5

26.5 27 27.5 28 28.5

21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26

26.5

27

22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27

27.5

28

Float 12627 (All profiles as of 22 Sep 2024)