1364780734.0388276

0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

32 33 34 35 36 37 38 Salinity (PSU)

-5 0 5 10 15 20 25 30 35

Insitu Temperature (˚C)

-5-4-3-2-101234567891011121314151617181920212223242526272829303132333435

0 100 200 300 400

Optode Oxygen Concentration (μm/kg) -5 0 5 10 15 20 25 30 35

Insitu Temperature (˚C)

Insitu Temperature (˚C)

-1.0 -0.5 0.0 0.5 ΔT= T^{Opt} - T^{SBE} (˚C)

-1.0 -0.5 0.0 0.5 ΔT= T^{Opt} - T^{SBE} (˚C)

Float: 0056 Profile: 153 Location: 38.2˚S 91.1˚E Date: 11/11/2012

Float: 0056 Profile: 153 Location: 38.2˚S 91.1˚E Date: 11/11/2012

05101520253035

Insitu Temperature (˚C)

32333435363738

Salinity (PSU)

32˚33˚34˚ 35˚36˚37˚ 38˚

0˚

5˚

10˚

15˚

20˚

25˚

30˚

35˚

05101520253035

Insitu Temperature (˚C)

32333435363738

Salinity (PSU)

05101520253035

Insitu Temperature (˚C)

32333435363738

Salinity (PSU)