1462804382.5147060

2502.8

2503.2

2503.6

2504.0

2504.4

2504.8

2505.2

Pumping Time (seconds)

0.0 0.2 0.4 0.6 0.8 1.0

Profile Number

Time Series of High Pressure Pump Time (Float 9761)

As of 09 May 2016