1408291620.5147060

1650

1700

1750

1800

1850

1900

1950

2000

2050

Pumping Time (seconds)

0 5 10 15 20 25 30 35

Profile Number

Time Series of High Pressure Pump Time (Float 8218)

As of 17 Aug 2014