1451225143.5147060

0.02.55.07.510.012.515.0

Number of Park-Phase Buoyancy Adjustments

0 10 20 30 40 50

Profile Number

Time Series of Park-Phase Buoyancy Adjustments (Float 8028)

As of 27 Dec 2015