Park-Level Temperature Statistics (Float 7806)

0 25 50 75 100 125 150 175 Profile Number

3.84.04.24.44.64.8

T_{Mean} (˚C)

3.84.04.24.44.64.8

T_{Max} (˚C)

3.84.04.24.44.64.8

T_{Min} (˚C)

0.000

0.025

0.050

0.075

0.100

0.125

0.150

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 7806)

0 25 50 75 100 125 150 175 Profile Number

950975

1000

1025

1050

1075

1100

1125

P_{Mean} (dbar)

950975

1000

1025

1050

1075

1100

1125

P_{Max} (dbar)

950975 1000

1025

1050

1075

1100

1125

P_{Min} (dbar)

0510152025

P_{StdDev} (dbar)