1408289873.9733172

101520253035404550

Bottom Piston Position

0.0 0.2 0.4 0.6 0.8 1.0 1.2

Profile Number

Piston Position Time Series (Float 7568)

112.5

113.0

113.5

114.0

114.5

115.0

115.5

Surface Piston Position

Profile Number

Park Piston Position

As of 17 Aug 2014