1467550167.9849012

Park-Level Temperature Statistics (Float 7389)

0 40 80 120 160 200 Profile Number

345678910

T_{Mean} (˚C)

345678910

T_{Max} (˚C)

345678910

T_{Min} (˚C)

0.00.10.20.30.40.50.60.70.8

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 7389)

0 40 80 120 160 200 Profile Number

600800

1000

1200

1400

P_{Mean} (dbar)

600800

1000

1200

1400

P_{Max} (dbar)

600800 1000

1200

1400

P_{Min} (dbar)

0255075100125

P_{StdDev} (dbar)