Park-Level Temperature Statistics (Float 7257)

0 2 4 6 8 10 12 Profile Number

22232425262728

T_{Mean} (˚C)

22232425262728

T_{Max} (˚C)

22232425262728

T_{Min} (˚C)

0.000.250.500.751.001.251.501.75

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 7257)

0 2 4 6 8 10 12 Profile Number

04080120160200

P_{Mean} (dbar)

04080120160200

P_{Max} (dbar)

04080120160200

P_{Min} (dbar)

0102030405060

P_{StdDev} (dbar)