1467550690.9849012

Park-Level Temperature Statistics (Float 7254)

0 40 80 120 160 200 Profile Number

3.43.63.84.04.24.44.6

T_{Mean} (˚C)

3.43.63.84.04.24.44.6

T_{Max} (˚C)

3.43.63.84.04.24.44.6

T_{Min} (˚C)

0.000.040.080.120.160.20

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 7254)

0 40 80 120 160 200 Profile Number 950 1000

1050

1100

1150

1200

1250

P_{Mean} (dbar)

950 1000

1050

1100

1150

1200

1250

P_{Max} (dbar)

950 1000

1050

1100

1150

1200

1250

P_{Min} (dbar)

0102030405060

P_{StdDev} (dbar)