1408797873.9849012

0 20 40 60 80 100

Profile Number

Park-Level Temperature Statistics (Float 7216)

3.43.63.84.04.24.44.6

T_{Mean} (˚C)

3.43.63.84.04.24.44.6

T_{Max} (˚C)

3.43.63.84.04.24.44.6

T_{Min} (˚C)

010203040506070

T_{StdDev} (˚C)

0 20 40 60 80 100

Profile Number

Park-Level Pressure Statistics (Float 7216)

8008408809209601000

1040

1080

P_{Mean} (dbar)

8008408809209601000

1040

1080

P_{Max} (dbar)

8008408809209601000

1040

1080

P_{Min} (dbar)

051015202530

P_{StdDev} (dbar)