1423403035.9849012

0 25 50 75 100 125 150 175

Profile Number

Park-Level Temperature Statistics (Float 7161)

3.23.43.63.84.04.2

T_{Mean} (˚C)

3.23.43.63.84.04.2

T_{Max} (˚C)

3.23.43.63.84.04.2

T_{Min} (˚C)

0.000.010.020.030.040.050.060.070.08

T_{StdDev} (˚C)

0 25 50 75 100 125 150 175

Profile Number

Park-Level Pressure Statistics (Float 7161)

9509751000

1025

1050

1075

1100

1125

P_{Mean} (dbar)

9509751000

1025

1050

1075

1100

1125

P_{Max} (dbar)

9509751000

1025

1050

1075

1100

1125

P_{Min} (dbar)

048121620

P_{StdDev} (dbar)