Park-Level Temperature Statistics (Float 7141)

0 50 100 150 200 250 300 350 Profile Number

3.253.503.754.004.254.504.755.00

T_{Mean} (˚C)

3.253.503.754.004.254.504.755.00

T_{Max} (˚C)

3.253.503.754.004.254.504.755.00

T_{Min} (˚C)

0.000

0.025

0.050

0.075

0.100

0.125

0.150

0.175

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 7141)

0 50 100 150 200 250 300 350 Profile Number

920960

1000

1040

1080

1120

1160

P_{Mean} (dbar)

920960

1000

1040

1080

1120

1160

P_{Max} (dbar)

920960 1000

1040

1080

1120

1160

P_{Min} (dbar)

05101520253035

P_{StdDev} (dbar)