Park-Level Temperature Statistics (Float 7139)

-0.2 0.0 0.2 Profile Number

-0.20.00.2

T_{Mean} (˚C)

-0.20.00.2

T_{Max} (˚C)

-0.20.00.2

T_{Min} (˚C)

-0.20.00.2

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 7139)

-0.2 0.0 0.2 Profile Number

-0.20.00.2

P_{Mean} (dbar)

-0.20.00.2

P_{Max} (dbar)

-0.20.00.2

P_{Min} (dbar)

-0.20.00.2

P_{StdDev} (dbar)