1428328259.5147060

1200

1400

1600

1800

2000

2200

2400

2600

Pumping Time (seconds)

0 40 80 120 160 200 240

Profile Number

Time Series of High Pressure Pump Time (Float 6879)

As of 06 Apr 2015