1393767145.5493044

0 25 50 75 100 125

Profile Number

Time Series of Electric Current Consumption (Float 6751)

0200400600800

High Pressure Pump Current (mA)

Air Pump Current (mA)

0200400600800

SBE41 Current (mA)

Quiescent Current (mA)