1408287442.9849012

0 0 0 1 1 1 1

Profile Number

Park-Level Temperature Statistics (Float 6644)

3

T_{Mean} (˚C)

3 3 3

T_{Max} (˚C)

3 3 3

T_{Min} (˚C)

-00

T_{StdDev} (˚C)

0 0 0 1 1 1 1

Profile Number

Park-Level Pressure Statistics (Float 6644)

1300

1305

1310

1315

1320

1325

1330

P_{Mean} (dbar)

1300

1305

1310

1315

1320

1325

1330

P_{Max} (dbar)

1300

1305

1310

1315

1320

1325

1330

P_{Min} (dbar)

-00

P_{StdDev} (dbar)