1408287436.9849012

0 10 20 30 40 50 60 70 80

Profile Number

Park-Level Temperature Statistics (Float 6643)

051015202530

T_{Mean} (˚C)

051015202530

T_{Max} (˚C)

051015202530

T_{Min} (˚C)

010203040506070

T_{StdDev} (˚C)

0 10 20 30 40 50 60 70 80

Profile Number

Park-Level Pressure Statistics (Float 6643)

02505007501000

1250

1500

P_{Mean} (dbar)

02505007501000

1250

1500

P_{Max} (dbar)

02505007501000

1250

1500

P_{Min} (dbar)

0102030405060

P_{StdDev} (dbar)