1408287358.9026100

0.0988

0.0992

0.0996

0.1000

0.1004

0.1008

0.1012

Surface Pressure (decibars)

0.0 0.4 0.8 1.2 1.6 2.0 2.4

Profile Number

Surface Pressure for Float 6632

As of 17 Aug 2014