1467547014.9849012

Park-Level Temperature Statistics (Float 6488)

0 50 100 150 200 250 Profile Number

7.510.012.515.017.520.022.525.0

T_{Mean} (˚C)

7.510.012.515.017.520.022.525.0

T_{Max} (˚C)

7.510.012.515.017.520.022.525.0

T_{Min} (˚C)

024681012

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 6488)

0 50 100 150 200 250 Profile Number

-5050100150200250300350400

P_{Mean} (dbar)

-5050100150200250300350400

P_{Max} (dbar)

-5050100150200250300350400

P_{Min} (dbar)

0255075100125

P_{StdDev} (dbar)