Surface Pressure for Float 6397

-39999999112785233444864.000000000000000 0.000000000000000

39999999112785233444864.000000000000000

79999998225570466889728.000000000000000

119999997338355700334592.000000000000000

159999996451140933779456.000000000000000

199999995563926167224320.000000000000000

239999994676711400669184.000000000000000

Surface Pressure (decibars)

0 50 100 150 200 250 300 Profile Number

As of 18 Mar 2017