1408287011.9733172

255075100125150175

Bottom Piston Position

0 25 50 75 100 125 150 175

Profile Number

Piston Position Time Series (Float 6360)

100120140160180200220240

Surface Piston Position

Profile Number

Park Piston Position

As of 17 Aug 2014