Park-Level Temperature Statistics (Float 6355)

0 50 100 150 200 250 300 Profile Number

3456789

T_{Mean} (˚C)

3456789

T_{Max} (˚C)

3456789

T_{Min} (˚C)

0.00.10.20.30.40.50.60.70.8

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 6355)

0 50 100 150 200 250 300 Profile Number

900950

1000

1050

1100

1150

1200

1250

1300

1350

P_{Mean} (dbar)

900950

1000

1050

1100

1150

1200

1250

1300

1350

P_{Max} (dbar)

900950 1000

1050

1100

1150

1200

1250

1300

1350

P_{Min} (dbar)

020406080

P_{StdDev} (dbar)