1408286763.9849012

0 20 40 60 80

Profile Number

Park-Level Temperature Statistics (Float 6311)

23456789

T_{Mean} (˚C)

23456789

T_{Max} (˚C)

23456789

T_{Min} (˚C)

01

T_{StdDev} (˚C)

0 20 40 60 80

Profile Number

Park-Level Pressure Statistics (Float 6311)

9259509751000

1025

1050

1075

1100

P_{Mean} (dbar)

9259509751000

1025

1050

1075

1100

P_{Max} (dbar)

9259509751000

1025

1050

1075

1100

P_{Min} (dbar)

0258101215

P_{StdDev} (dbar)