Time Series of Park-Phase Buoyancy Adjustments (Float 6310)

-0.4-0.2-0.00.20.40.60.81.0

Number of Park-Phase Buoyancy Adjustments

0 50 100 150 200 250 300 Profile Number

As of 03 Oct 2018