1419686433.5147060

-0.4-0.20.00.20.40.60.81.0

Number of Park-Phase Buoyancy Adjustments

0 40 80 120 160 200

Profile Number

Time Series of Park-Phase Buoyancy Adjustments (Float 6307)

As of 27 Dec 2014