1408286620.9849012

0 0 0 1 1 1 1

Profile Number

Park-Level Temperature Statistics (Float 6284)

4

T_{Mean} (˚C)

4 4 4

T_{Max} (˚C)

4 4 4

T_{Min} (˚C)

-00

T_{StdDev} (˚C)

0 0 0 1 1 1 1

Profile Number

Park-Level Pressure Statistics (Float 6284)

876880884888892896900

P_{Mean} (dbar)

876880884888892896900

P_{Max} (dbar)

876880884888892896900

P_{Min} (dbar)

-00

P_{StdDev} (dbar)