1408285846.5493044

0 50 100 150 200 250 300

Profile Number

Time Series of Electric Current Consumption (Float 5426)

0100200300400500

High Pressure Pump Current (mA)

Air Pump Current (mA)

020406080100

SBE41cp Current (mA)

Quiescent Current (mA)