1408285600.5147060

0.02.55.07.510.012.515.017.5

Number of Park-Phase Buoyancy Adjustments

0 40 80 120 160 200

Profile Number

Time Series of Park-Phase Buoyancy Adjustments (Float 5409)

As of 17 Aug 2014