1408285301.5147060

1903.6

1904.0

1904.4

1904.8

1905.2

1905.6

1906.0

Pumping Time (seconds)

0.0 0.2 0.4 0.6 0.8 1.0

Profile Number

Time Series of High Pressure Pump Time (Float 5345)

As of 17 Aug 2014