1408285190.5147060

1000

1250

1500

1750

2000

2250

2500

2750

Pumping Time (seconds)

0 40 80 120 160 200 240

Profile Number

Time Series of High Pressure Pump Time (Float 5324)

As of 17 Aug 2014