1408285181.5147060

1000

1200

1400

1600

1800

2000

2200

2400

Pumping Time (seconds)

0 10 20 30 40 50 60 70

Profile Number

Time Series of High Pressure Pump Time (Float 5323)

As of 17 Aug 2014