1408284138.5147060

1450

1500

1550

1600

1650

1700

1750

1800

1850

Pumping Time (seconds)

0 25 50 75 100 125 150 175

Profile Number

Time Series of High Pressure Pump Time (Float 5198)

As of 17 Aug 2014